ABC1: edge ON threshold scan at 240 V

TDC (ns)

0 10 20 30 40 50 60 70

Eff.

0

0.2

0.4

0.6

0.8

1_{0.98 fC}

1.50 fC 2.02 fC 2.43 fC 3.01 fC 3.57 fC