time (ns)

0 10 20 30 40 50 60 70 charge (fC)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 0035 link 1, EDGE OFF , B=1.56T Vbias = 100 V corrected threshold scale 0035 link 1, EDGE OFF , B=1.56T

Vbias = 150 V Vbias = 200 V Vbias = 250 V corrected threshold scale