residuals (cm)

-0.02 -0.015 -0.01 -0.005 0 0.005 0.01 0.015 0.02 0

20

40

60

80

100

120

Chi2 / ndf = 195.613 / 66 Constant = 122.249 +- 3.22031 Mean = -0.000426432 +- 5.955 Sigma = 0.00231988 +- 2.68557

Anchor 3 : run 1913 Chi2 / ndf = 195.613 / 66