RLT9: Av. cluster multiplicity 300 V

Thr. (fC)

1 2 3 4 5 6

Cluster multiplicity

1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4 efficient clusters

0 angle, no field 0 angle, B=1.65 T max angle, no field max angle, B=1.65 T