Residual (um)

-100 -50 0 50 100 0 100 200 300 400 500 600 residuals residual1

Nent = 9837 Mean = 0.3615 RMS = 13.44 Chi2 / ndf = 664.6 / 177 7.194 ± Constant = 491.9 0.07556 ± Mean = 0.3222 0.07054 ± Sigma = 7.066 ± ± ±