Residual (um)

-100 -50 0 50 100 0 50 100 150 200 250 300 350 residuals_{residual1}

Nent = 4157 Mean = -0.1103 RMS = 7.55 Chi2 / ndf = 203.3 / 84 6.183 ± Constant = 299.3 0.08198 ± Mean = 0.1114 0.06504 ± Sigma = 5.067 ± ± ±