Residual (um)

-100 -50 0 50 100 0 20 40 60 80 100 120 140 160 residuals residual1

Nent = 1469 Mean = -0.1653 RMS = 6.782 Chi2 / ndf = 109.6 / 62 5.556 ± Constant = 151.8 0.0951 ± Mean = -0.006098 0.08261 ± Sigma = 3.432 ± ± ±