Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Chi2 / ndf = 1.033e+04 / 74 26.42 ± Constant = 8272 0.07142 ± Mean = -0.8938 0.04524 ± Sigma = 26.2

RLT4 front: residuals @ 1fC_{Chi2 / ndf = 1.033e+04 / 74} ± ± ±

Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0 500 1000

1500

2000

2500

3000

3500

Chi2 / ndf = 1.721e+04 / 98 17.6 ± Constant = 3426 0.114 ± Mean = -5.428 0.08594 ± Sigma = 27.81

RLT4 back: residuals @ 1fC Chi2 / ndf = 1.721e+04 / 98 ± ± ±