Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0 50 100 150 200 250 300 350 400 Chi2 / ndf = 612.6 / 70 6.003 ± Constant = 395.4 0.3268 ± Mean = -4.655 0.1749 ± Sigma = 22.97

KEK3113 front: residuals @ 1fC Chi2 / ndf = 612.6 / 70 ± ± ±

Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0 50 100 150 200 250 300 350 400 Chi2 / ndf = 449.8 / 58 5.931 ± Constant = 398.6 0.3167 ± Mean = 4.989 0.1921 ± Sigma = 24.47

KEK3113 back: residuals @ 1fC Chi2 / ndf = 449.8 / 58 ± ± ±

X residual (um)

-200 -150 -100 -50 0 50 100 150 200 0

100

200

300

400

500

Chi2 / ndf = 313.5 / 88 7.721 ± Constant = 474.9 0.2566 ± Mean = -1.427 0.1938 ± Sigma = 19.78

X residual_{Chi2 / ndf = 313.5 / 88} ± ± ±

Y residual (um)

-3000 -2000 -1000 0 1000 2000 3000 0 20 40 60 80 100 120 140 160 180 200 Chi2 / ndf = 296.8 / 85 2.904 ± Constant = 184.2 9.988 ± Mean = -74.87 6.772 ± Sigma = 752.6

Y residual_{Chi2 / ndf = 296.8 / 85} ± ± ±