Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0

100

200

300

400

500

Chi2 / ndf = 665.3 / 65 6.598 ± Constant = 506.6 0.275 ± Mean = -2.582 0.1513 ± Sigma = 23.92

KEK3112 front: residuals @ 1fC Chi2 / ndf = 665.3 / 65 ± ± ±

Residual (um)

-200 -150 -100 -50 0 50 100 150 200 0

100

200

300

400

500

Chi2 / ndf = 717.4 / 56 6.854 ± Constant = 538.3 0.2664 ± Mean = 4.836 0.1448 ± Sigma = 23.58

KEK3112 back: residuals @ 1fC Chi2 / ndf = 717.4 / 56 ± ± ±

X residual (um)

-200 -150 -100 -50 0 50 100 150 200 0 100 200 300 400 500 600

Chi2 / ndf = 350 / 86 9.065 ± Constant = 656.1 0.2163 ± Mean = -1.584 0.1585 ± Sigma = 19.4

X residual_{Chi2 / ndf = 350 / 86} ± ± ±

Y residual (um)

-3000 -2000 -1000 0 1000 2000 3000 0

50

100

150

200

250

Chi2 / ndf = 395.5 / 92 3.262 ± Constant = 244.1 8.797 ± Mean = -23.99 5.627 ± Sigma = 769.9

Y residual_{Chi2 / ndf = 395.5 / 92} ± ± ±