FRK153 plane 0, noise run 2780: 0.89 fC, 120 V: occupancy 0.024465

channel

0 100 200 300 400 500 600 700

# hits

0 1000

2000

3000

4000

5000

6000

7000 hitmap

1 2 3 4 5 6 7 8 9 0

2000

4000

6000

8000

10000 2 x10 av. multiplicity

channel

0 100 200 300 400 500 600 700 event no

0

50

100

150

200

250 hits vs eventno

total hits

0 50 100 150 200 250 300 350 counts

1

10

10^2

10^3

# hits/events_{Chi2 / ndf = 4518 / 208}

6.358 ± Constant = 586.9 0.1391 ± Mean = 48.39 0.07952 ± Sigma = 10.76 ± ± ±