corr. threshold (fC)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 noise occupancy

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} noise runs RLT5 link 0