0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 RLT9 link 0 Nent = 608 Mean = 0.4891 RMS = 0.3071

av. cluster width_{RLT9 link 0}