0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45

multeta Nent = 2141 Mean = 0.5011 RMS = 0.2939 Under = 0 Over = 0 Chi2 / ndf = 19.15 / 12 0.02734 ± Constant = 0.2913 0.009954 ± Mean = 0.4969 0.01152 ± Sigma = 0.1481

mult vs eta^{multeta}_{Nent = 2141}

± ± ±