Bias Voltage (V)

60 80 100 120 140 160 180 200 220 240 260 280

Incidence Angle (deg.)

-15 -10 -5 0 5 10 15

Median Charge (fC)

0 0.5 1 1.5 2 2.5 3 3.5 4

Testbeam Aug 2000 RLT5 Median Charge @ B=0.00 T