Bias Voltage (V)

0 100 200 300 400 500

Lorentz Angle (deg)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 Testbeam Aug 2000 RLT10 Lorentz Angle @ B=1.56 T