-20 -15 -10 -5 0 5 10 15 20 1 1.05 1.1 1.15 1.2 1.25 1.3 1.35 1.4 1.45 1.5 Test Beam August 2000 - RLT5-0 @ 80 V 1.56 T - Lorentz angle: 3.0 +/- 0.6