Corr. Bias Voltage (V)

0 100 200 300 400 500

Median Charge (fC)

0 0.5 1 1.5 2 2.5 3 3.5

H8 SCT Test Beam August 2000 - K3113* - 1.56 T field - perp. incidence - front - Qtot: 3.1 +/- 0.1 - Vdep: 343 +/- 10 - back - Qtot: 3.3 +/- 0.7 - Vdep: 318 +/- 14