Incidence Angle (deg)

-20 -15 -10 -5 0 5 10 15 20

Median Charge (fC)

0 0.5 1 1.5 2 2.5 3 3.5

80 V

FRK153 - 0 : median charge vs angle : B = 1.56 T

120 V 160 V 200 V 250 V