inclination (deg)

LA

S E N W S

inclination (deg)

0 20 40 60 80 100 120 140 CO length in rock (km)

S E N W S

inclination (deg)

CLF

S E N W S

inclination (deg)

0 20 40 60 80 100 120 140 CLF2

S E N W S

inclination (deg)

LL

S E N W S

inclination (deg)

0 20 40 60 80 100 120 140 LM

S E N W S

0 0.5 1 1.5 2 2.5

0 100 200 300 0 0.5 1 1.5 2 2.5

0 100 200 300

0 0.5 1 1.5 2 2.5

0 100 200 300 0 0.5 1 1.5 2 2.5

0 100 200 300

0 0.5 1 1.5 2 2.5

0 100 200 300 0 0.5 1 1.5 2 2.5

0 100 200 300